From a6c1ed4716cf02626ea035beb6dd4a921642ba80 Mon Sep 17 00:00:00 2001
From: PikalaxALT <pikalaxalt@gmail.com>
Date: Wed, 3 Jan 2018 17:39:24 -0700
Subject: Use libc from agbcc instead of standalone newlib\nYou must have AGBCC
 commit 80d029caec189587f8b9294b6c8a5a489b8f5f88 in order to compile
 pmd_red.gba

---
 newlib/libc/signal/signal.tex | 70 -------------------------------------------
 1 file changed, 70 deletions(-)
 delete mode 100644 newlib/libc/signal/signal.tex

(limited to 'newlib/libc/signal/signal.tex')

diff --git a/newlib/libc/signal/signal.tex b/newlib/libc/signal/signal.tex
deleted file mode 100644
index 08c15be..0000000
--- a/newlib/libc/signal/signal.tex
+++ /dev/null
@@ -1,70 +0,0 @@
-@node Signals
-@chapter Signal Handling (@file{signal.h})
-
-A @dfn{signal} is an event that interrupts the normal flow of control
-in your program.  Your operating environment normally defines the full
-set of signals available (see @file{sys/signal.h}), as well as the
-default means of dealing with them---typically, either printing an
-error message and aborting your program, or ignoring the signal.
-
-All systems support at least the following signals:
-@table @code
-@item SIGABRT
-Abnormal termination of a program; raised by the <<abort>> function.
-
-@item SIGFPE
-A domain error in arithmetic, such as overflow, or division by zero.
-
-@item SIGILL
-Attempt to execute as a function data that is not executable.
-
-@item SIGINT
-Interrupt; an interactive attention signal.
-
-@item SIGSEGV
-An attempt to access a memory location that is not available.
-
-@item SIGTERM
-A request that your program end execution.
-@end table
-
-Two functions are available for dealing with asynchronous
-signals---one to allow your program to send signals to itself (this is
-called @dfn{raising} a signal), and one to specify subroutines (called
-@dfn{handlers} to handle particular signals that you anticipate may
-occur---whether raised by your own program or the operating environment.
-
-To support these functions, @file{signal.h} defines three macros:
-
-@table @code
-@item SIG_DFL
-Used with the @code{signal} function in place of a pointer to a
-handler subroutine, to select the operating environment's default
-handling of a signal.
-
-@item SIG_IGN
-Used with the @code{signal} function in place of a pointer to a
-handler, to ignore a particular signal.
-
-@item SIG_ERR
-Returned by the @code{signal} function in place of a pointer to a
-handler, to indicate that your request to set up a handler could not
-be honored for some reason.
-@end table
-
-@file{signal.h} also defines an integral type, @code{sig_atomic_t}.
-This type is not used in any function declarations; it exists only to
-allow your signal handlers to declare a static storage location where
-they may store a signal value.  (Static storage is not otherwise
-reliable from signal handlers.)
-
-@menu
-* raise::   Send a signal
-* signal::  Specify handler subroutine for a signal
-@end menu
-
-@page
-@include signal/raise.def
-
-@page
-@include signal/signal.def
-- 
cgit v1.2.3

